-- Migration 046 — QCT / Quanta Cloud Technology product images (direct URL injection)
--
-- QCT T3048-LY8: og:image accessible via plain HTTP on qct.io
--   URL: qct.io/product/index/Networking/Ethernet-Switch/T3000-Series/QuantaMesh-T3048-LY8
--   og:image: qct.io/upload/website/product/gallery/normal/NetworkSwitch-QuantaMesh-T3048-LY8_FrontView02-740x460_16111812291.png
--
-- T7032-IX1 and T7064-*/T9032-* have no accessible og:image (JS-rendered or no dedicated page).

UPDATE switches
SET image_url        = 'https://www.qct.io/upload/website/product/gallery/normal/NetworkSwitch-QuantaMesh-T3048-LY8_FrontView02-740x460_16111812291.png',
    product_page_url = COALESCE(product_page_url, 'https://www.qct.io/product/index/Networking/Ethernet-Switch/T3000-Series/QuantaMesh-T3048-LY8'),
    assets_scraped_at = NOW()
WHERE model = 'QuantaMesh T3048-LY8'
  AND vendor_id = (SELECT id FROM vendors WHERE slug = 'quanta-cloud-technology');
