-- Migration 062 — Synology, TRENDnet, Waystream, Kemp Technologies, LANCOM Systems
--
-- Synology: synology.com/img/products/detail/{model}/heading.png
--   SA6400: verified HTTP 200 PNG (2026-04-21).
--
-- TRENDnet: trendnet.com/images/products/photos/{model}_v{rev}/{model}_d01_2.webp
--   TPE-5048WS: verified HTTP 200 WEBP (2026-04-21).
--
-- Waystream: waystream.com/wp-content/uploads (official WP media).
--   ASR8000-300x500-2.png: verified HTTP 200 PNG (2026-04-21).
--
-- Kemp Technologies: kemptechnologies.com Sitefinity CMS static images.
--   LM-X40-NG: verified HTTP 200 PNG (2026-04-21).
--   Note: image shows X25-NG + X25MT-NG + X40-NG family shot (no solo X40 found).
--
-- LANCOM Systems: lancom-systems.com/fileadmin/images/products (official LANCOM file CDN).
--   GS-4554XP: verified HTTP 200 PNG (2026-04-21).

-- ── Synology ──────────────────────────────────────────────────────────────────

-- SA6400 — 12-bay 2U NAS (high-density storage with 10GbE switching)
UPDATE switches
SET image_url        = 'https://www.synology.com/img/products/detail/SA6400/heading.png',
    product_page_url = COALESCE(product_page_url, 'https://www.synology.com/en-global/products/SA6400'),
    assets_scraped_at = NOW()
WHERE model = 'SA6400'
  AND vendor_id = (SELECT id FROM vendors WHERE slug = 'synology');

-- ── TRENDnet ──────────────────────────────────────────────────────────────────

-- TPE-5048WS — 48×1G PoE+ + 4×10G SFP+ managed PoE switch
UPDATE switches
SET image_url        = 'https://www.trendnet.com/images/products/photos/TPE-5048WS_v1/TPE-5048WS_d01_2.webp',
    product_page_url = COALESCE(product_page_url, 'https://www.trendnet.com/products/switch/tpe-5048ws'),
    assets_scraped_at = NOW()
WHERE model = 'TPE-5048WS'
  AND vendor_id = (SELECT id FROM vendors WHERE slug = 'trendnet');

-- ── Waystream ─────────────────────────────────────────────────────────────────

-- ASR 8000 — high-capacity carrier-grade access/aggregation switch-router
UPDATE switches
SET image_url        = 'https://www.waystream.com/wp-content/uploads/ASR8000-300x500-2.png',
    product_page_url = COALESCE(product_page_url, 'https://www.waystream.com/products/asr-8000/'),
    assets_scraped_at = NOW()
WHERE model = 'ASR 8000'
  AND vendor_id = (SELECT id FROM vendors WHERE slug = 'waystream');

-- ── Kemp Technologies ─────────────────────────────────────────────────────────

-- LoadMaster LM-X40 — high-performance hardware ADC / load balancer
-- Image shows X25-NG / X25MT-NG / X40-NG family (no standalone X40 photo found).
UPDATE switches
SET image_url        = 'https://kemptechnologies.com/images/kemptechnologieslibraries/products/loadmaster/x25-ng_lm-x25mt-ng_lm-x40-ngc5671ce086df4279a356474294d27365.png',
    product_page_url = COALESCE(product_page_url, 'https://kemptechnologies.com/server-load-balancing-appliances/loadmaster-x40/overview/'),
    assets_scraped_at = NOW()
WHERE model = 'LoadMaster LM-X40'
  AND vendor_id = (SELECT id FROM vendors WHERE slug = 'kemp-technologies');

-- ── LANCOM Systems ────────────────────────────────────────────────────────────

-- GS-4554XP — 48×1G PoE++ + 4×10G SFP+ managed enterprise switch
UPDATE switches
SET image_url        = 'https://www.lancom-systems.com/fileadmin/images/products/lc_GS-4554XP/GS-4554XP-front.png',
    product_page_url = COALESCE(product_page_url, 'https://www.lancom-systems.com/products/switches-accessories/gs-4554xp/'),
    assets_scraped_at = NOW()
WHERE model = 'GS-4554XP'
  AND vendor_id = (SELECT id FROM vendors WHERE slug = 'lancom-systems');
